<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="8.6.0">
<drawing>
<board>
<plain>
<wire x1="59.69" y1="45.72" x2="105.08" y2="45.72" width="0" layer="20"/>
<wire x1="105.08" y1="45.72" x2="105.08" y2="82.54" width="0" layer="20"/>
<wire x1="105.08" y1="82.54" x2="59.69" y2="82.54" width="0" layer="20"/>
<wire x1="59.69" y1="82.54" x2="59.69" y2="45.72" width="0" layer="20"/>
</plain>
<libraries>
<library name="eagle-ltspice">
<description>Default symbols for import LTspice schematics&lt;p&gt;
2012-10-29 alf@cadsoft.de&lt;br&gt;</description>
<packages>
<package name="C1206">
<description>&lt;b&gt;CAPACITOR&lt;/b&gt;</description>
</package>
</packages>
</library>
<library name="fab">
<packages>
<package name="SOIC14">
<description>&lt;b&gt;Small Outline Package&lt;/b&gt;</description>
</package>
<package name="R1206">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;</description>
</package>
<package name="2X03">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="EFOBM">
</package>
</packages>
</library>
<library name="con-lsta">
<description>&lt;b&gt;Female Headers etc.&lt;/b&gt;&lt;p&gt;
Naming:&lt;p&gt;
FE = female&lt;p&gt;
# contacts - # rows&lt;p&gt;
W = angled&lt;p&gt;
&lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;</description>
<packages>
<package name="FE06">
<description>&lt;b&gt;FEMALE HEADER&lt;/b&gt;</description>
</package>
</packages>
</library>
<library name="buzzer1">
<packages>
<package name="BUZZER">
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="C1" library="eagle-ltspice" package="C1206" value="1uF">
<attribute name="SPICEMODEL" value="NONE"/>
<attribute name="SPICEPREFIX" value="C"/>
</element>
<element name="IC1" library="fab" package="SOIC14" value="ATTINY44-SSU"/>
<element name="R6" library="fab" package="R1206" value="10k"/>
<element name="SV1" library="con-lsta" package="FE06" value="">
<attribute name="MF" value=""/>
<attribute name="MPN" value=""/>
<attribute name="OC_FARNELL" value="unknown"/>
<attribute name="OC_NEWARK" value="unknown"/>
<attribute name="SPICEPREFIX" value="X"/>
</element>
<element name="U$1" library="fab" package="2X03" value="AVRISP"/>
<element name="U$2" library="fab" package="EFOBM" value="RESONATOR"/>
<element name="R1" library="fab" package="R1206" value="0"/>
<element name="R2" library="fab" package="R1206" value="0"/>
<element name="U$3" library="buzzer1" package="BUZZER" value="BUZZER"/>
</elements>
<signals>
<signal name="GND">
<contactref element="U$2" pad="2"/>
<contactref element="IC1" pad="14"/>
<contactref element="U$1" pad="6"/>
<contactref element="SV1" pad="1"/>
<contactref element="R2" pad="2"/>
<contactref element="R2" pad="1"/>
<contactref element="R1" pad="2"/>
<contactref element="R1" pad="1"/>
<contactref element="C1" pad="1"/>
<contactref element="U$3" pad="4"/>
</signal>
<signal name="MISO">
<contactref element="IC1" pad="8"/>
<contactref element="U$1" pad="1"/>
</signal>
<signal name="MOSI">
<contactref element="IC1" pad="7"/>
<contactref element="U$1" pad="4"/>
</signal>
<signal name="SCK">
<contactref element="IC1" pad="9"/>
<contactref element="U$1" pad="3"/>
</signal>
<signal name="RST">
<contactref element="IC1" pad="4"/>
<contactref element="R6" pad="1"/>
<contactref element="U$1" pad="5"/>
</signal>
<signal name="CTS">
<contactref element="SV1" pad="2"/>
</signal>
<signal name="TX">
<contactref element="SV1" pad="4"/>
<contactref element="IC1" pad="13"/>
</signal>
<signal name="RX">
<contactref element="SV1" pad="5"/>
<contactref element="IC1" pad="12"/>
</signal>
<signal name="RTS">
<contactref element="SV1" pad="6"/>
</signal>
<signal name="PB0">
<contactref element="U$2" pad="1"/>
<contactref element="IC1" pad="2"/>
</signal>
<signal name="PB1">
<contactref element="U$2" pad="3"/>
<contactref element="IC1" pad="3"/>
</signal>
<signal name="+5V">
<contactref element="R6" pad="2"/>
<contactref element="U$1" pad="2"/>
<contactref element="C1" pad="2"/>
<contactref element="IC1" pad="1"/>
<contactref element="SV1" pad="3"/>
</signal>
<signal name="BUZZER">
<contactref element="IC1" pad="10"/>
<contactref element="U$3" pad="1"/>
</signal>
<signal name="N$1">
</signal>
</signals>
</board>
</drawing>
</eagle>
